; $Id: VBoxREM.def 44528 2013-02-04 14:27:54Z vboxsync $
;; @file
; VBoxREM Definition File.
;

;
; Copyright (C) 2006-2011 Oracle Corporation
;
; This file is part of VirtualBox Open Source Edition (OSE), as
; available from http://www.virtualbox.org. This file is free software;
; you can redistribute it and/or modify it under the terms of the GNU
; General Public License (GPL) as published by the Free Software
; Foundation, in version 2 as it comes in the "COPYING" file of the
; VirtualBox OSE distribution. VirtualBox OSE is distributed in the
; hope that it will be useful, but WITHOUT ANY WARRANTY of any kind.
;

LIBRARY VBoxREM.dll

EXPORTS
    REMR3Init
    REMR3InitFinalize
    REMR3Term
    REMR3Reset
    REMR3Step
    REMR3BreakpointSet
    REMR3BreakpointClear
    REMR3Run
    REMR3EmulateInstruction
    REMR3State
    REMR3StateBack
    REMR3StateUpdate
    REMR3A20Set
    REMR3DisasEnableStepping
    REMR3ReplayHandlerNotifications
    REMR3NotifyPhysRamRegister
    REMR3NotifyPhysRamDeregister
    REMR3NotifyPhysRomRegister
    REMR3NotifyHandlerPhysicalModify
    REMR3NotifyHandlerPhysicalRegister
    REMR3NotifyHandlerPhysicalDeregister
    REMR3NotifyInterruptSet
    REMR3NotifyInterruptClear
    REMR3NotifyTimerPending
    REMR3NotifyDmaPending
    REMR3NotifyQueuePending
    REMR3NotifyFF
    REMR3NotifyCodePageChanged
    REMR3IsPageAccessHandled
    REMR3NotifyPendingInterrupt
    REMR3QueryPendingInterrupt

